Re: Paint

I left my ‘13 trunk at an automotive paint supplier to work up. Their scanner couldn’t get it and they said they’d work on it manually. I left it for 24 hours came back and their sample wasn’t even close. I took it to a body shop and the guy scanned it and said he couldn’t match it either. I gave up and bought the colorite. First can wasn’t close, next 2 cans were dead on.

It’s so hard to match colors when they are spraying with robots and using the absolute least amount of paint possible to cover. Unfortunately, that cant be duplicated by hand so we always put too much paint on which changes the color.

Damn robots.
Statistics: Posted by Festus — Wed Jul 31, 2019 9:10 pm